         180           8
  0.198032051676398      -0.376196790889344      -0.576388999048288     
 -0.787503532626063       -1.13186773319518       -1.40969558647618     
  -1.62508981485170       -1.91145229320342     
  -2.83247718098526       -2.45769610257582       -2.15902748048057     
  -2.04664898593007       -1.84220121599695       -1.51259649047017     
  -1.16414865340106      -0.845677508840625     
 -7.961320117793437E-003  0.000000000000000E+000
   1.00963357832966       0.000000000000000E+000
   1.01338001250821       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
