         180           8
 -0.959343623108582       -1.23328149579740       -1.46632104974639     
  -1.75846880913527       -2.11691375001338       -2.33905828425790     
  -2.50255580906795       -2.49463498226235     
  -2.49171909781649       -2.24989441124318       -1.87753050676231     
  -1.55544522003333       -1.43929525817863       -1.40957075476269     
  -1.10422516143740      -0.765946985092751     
 -7.892635063118511E-003  0.000000000000000E+000
   1.00927803878857       0.000000000000000E+000
   1.01313981272665       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
