         180           8
  -1.79884673287347       -2.17116668427201       -2.29873959076088     
  -2.43326063551815       -2.61669537852987       -2.78238834881063     
  -2.95933885994829       -3.01011584539281     
  -2.51779723061433       -2.44221802782481       -2.16693311627679     
  -1.74468237930637       -1.51674331436688       -1.41103584822882     
  -1.28002457219973       -1.03317668461407     
 -7.925788733550517E-003  0.000000000000000E+000
   1.00941255396935       0.000000000000000E+000
   1.01332018996826       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
