         180           8
 -0.848226462525035      -0.957223005255650       -1.14175285913077     
  -1.35713706458569       -1.59684585550791       -1.81955466702026     
  -2.00434871162255       -2.05010810057235     
  -2.78409758116686       -2.39276786595089       -2.12319420934467     
  -1.86855388894332       -1.72354641935102       -1.66376059377896     
  -1.45261013656147       -1.05712159493564     
 -7.929610888637155E-003  0.000000000000000E+000
   1.00964125571277       0.000000000000000E+000
   1.01347767020216       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
