         180           3
   6.30713393410806        8.22892558794077        10.1501507417218     
  -1.25519812029930      -0.777037599056311      -6.099422378445282E-002
  5.983620781828658E-004  0.000000000000000E+000
  0.987355917796540       0.000000000000000E+000
  0.984639784610328       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
