         180           8
 -0.842608322555329      -0.938400507205086       -1.06622515025363     
  -1.15864219925783       -1.33792885852368       -1.56379608056761     
  -1.53354754044672       -1.72047631680153     
  -3.29011781774760       -2.98090858568285       -2.71604100113611     
  -2.48552448148516       -2.41068382136838       -2.28825955876915     
  -1.90308063070105       -1.45115073309420     
 -7.735933097366345E-003  0.000000000000000E+000
   1.00973871499274       0.000000000000000E+000
   1.01358912245180       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
