         180           8
  -1.42279119210250       -1.61348291038120       -1.90769653236713     
  -2.11994926545976       -2.19989212819696       -2.28248634433867     
  -2.46022390250361       -2.50470799171609     
  -2.84080897644111       -2.68210231280831       -2.62176001131761     
  -2.42623547614893       -2.03756163668350       -1.68777660384658     
  -1.43893040807134       -1.16287391100499     
 -7.739498914650153E-003  0.000000000000000E+000
   1.00962861767879       0.000000000000000E+000
   1.01367398294654       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
