         180           8
  0.501918761747807      -0.396344788643250       -1.17418256283940     
  -1.90102098132829       -2.50554964925003       -3.09647819793632     
  -3.65235158431849       -4.23770204156904     
 -0.307112513303573      -0.462277277020302      -0.668616829882318     
 -0.925755401132131       -1.06470703800097       -1.10879471198290     
  -1.19908122246604       -1.34145053769668     
 -7.943073497594745E-003  0.000000000000000E+000
   1.00971539548192       0.000000000000000E+000
   1.01416404069638       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
