         180           8
   4.17203094746934        3.39703429521277        2.65643653967273     
   1.94992906246807        1.17108804972603       0.429906130556572     
 -0.207725733574022      -0.761463876584611     
  -1.17537406523125       -1.05917072766123       -1.26816021396974     
  -1.36065053846842       -1.47028111642897       -1.71649560960765     
  -1.90176954518497       -1.93250883217005     
 -7.797020295011300E-003  0.000000000000000E+000
   1.00960904362104       0.000000000000000E+000
   1.01352607244271       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
