         180           8
   6.29561608430169        5.61257763302406        4.98802624089261     
   4.36779404807800        3.68178388367538        2.99268635767965     
   2.34777823690356        1.67447336285621     
  -1.24746668843063       -1.61881904798092       -1.85960349415191     
  -1.90711053987240       -1.90269409116592       -2.00543569152046     
  -2.27802777242690       -2.50670465404697     
 -7.762268961790130E-003  0.000000000000000E+000
   1.00952764856183       0.000000000000000E+000
   1.01381976144575       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
