         180           8
  0.812215129782220       0.112021789827587      -0.602244361639377     
  -1.32612627586667       -2.09032391000381       -2.84809626926381     
  -3.42847018728657       -3.65081332484679     
 -0.664875677379083      -0.717895595924691      -0.840010289652038     
 -0.927587239382966       -1.11754978448593       -1.47531722401536     
  -1.70980932238191       -1.57122115234581     
 -7.824929274269881E-003  0.000000000000000E+000
   1.00923729317673       0.000000000000000E+000
   1.01282410478982       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
