         180           8
   1.90656553681150        1.24198528837805       0.575357755841426     
 -9.150518704782430E-002 -0.786153730820451       -1.50776329477937     
  -2.23440925571625       -2.78537845252401     
 -0.629803794275005       -1.04344971071600       -1.13418748111690     
  -1.20551209335872       -1.37973495225210       -1.56848138179967     
  -1.79959681482479       -2.00100949422379     
 -7.843792819369672E-003  0.000000000000000E+000
   1.00943009618571       0.000000000000000E+000
   1.01333036492666       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
