         180           3
   13.2576866201727        10.5888797764485        8.17171786678118     
  0.234948332082659      -7.559032641366296E-002 -0.968822863708190     
  8.281852604482790E-004  0.000000000000000E+000
  0.987244248267318       0.000000000000000E+000
  0.984735187479557       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
