         180           8
   1.36304073235675       0.639900412166970      -8.777625672403333E-002
 -0.720164326981670       -1.33677185041719       -2.00106469804003     
  -2.61501058792550       -3.36701122802787     
 -0.276968976722494      -0.670121719018314       -1.01183538336298     
  -1.15714953148861       -1.15974024491300       -1.29138494561697     
  -1.39532047843228       -1.67139560119812     
 -7.866397635240330E-003  0.000000000000000E+000
   1.00953099941901       0.000000000000000E+000
   1.01326174080186       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
