         180           8
   2.13018548799357        1.35083639172585       0.648888577341948     
 -0.133737027074334      -0.854796386751679       -1.47734144921858     
  -2.09006969759131       -2.66274251972240     
 -0.910410410861407       -1.00823417932303       -1.20205689629614     
  -1.50219863691310       -1.75876314555635       -1.77466019658693     
  -1.75950595458364       -1.73328482111526     
 -7.871307989863135E-003  0.000000000000000E+000
   1.00945197019672       0.000000000000000E+000
   1.01362362009165       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
