         180           8
   1.34773222582530       0.636814718066077      -7.854021445911551E-002
 -0.741907911840099       -1.36990311491412       -2.05350150991114     
  -2.82006795255408       -3.47551207546894     
  -1.53620822641983       -1.54425764058578       -1.64707361808358     
  -1.75677999096179       -1.75448613641335       -1.65360678643834     
  -1.65353814351334       -1.99435947805418     
 -8.225322420628782E-003  0.000000000000000E+000
   1.00995442452558       0.000000000000000E+000
   1.01429322608147       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
