         180           8
   3.18806333217658        2.40800370608132        1.65080124684355     
  0.894815966489840       0.131941581292613      -0.587594289826225     
  -1.24830106860733       -1.87956731698475     
 -0.812901767766486      -0.905997951811931       -1.08837829497425     
  -1.25509926550453       -1.39188862662970       -1.55964795380706     
  -1.67178180219561       -1.68494094416476     
 -7.715213444580136E-003  0.000000000000000E+000
   1.00911743464838       0.000000000000000E+000
   1.01336233867577       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
