         180           8
  -2.05605233814673       -2.54964975734978       -3.16475408572702     
  -3.77747446456418       -4.35714695083377       -4.89967478680056     
  -5.42710847229094       -5.84343369929587     
  0.597371685089298       0.500328345229095       0.415159568288839     
  0.324285694578449       0.191549384435393       2.176756459236391E-002
 -0.189774380397758      -0.278729070232532     
 -7.911182622483524E-003  0.000000000000000E+000
   1.00945160941621       0.000000000000000E+000
   1.01325144561457       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
