         180           8
   10.2951591204347        9.49251156825809        8.82681140251704     
   8.34640171901771        8.01517192753180        7.71901135384192     
   7.12559554371797        6.76946755783510     
  -2.11556289011356       -2.28212179551979       -2.47134964858254     
  -2.85893216020693       -3.41562765383536       -3.99306083504750     
  -3.96078592838649       -4.25220734003879     
  1.368795882889594E-003  0.000000000000000E+000
  0.987346637583281       0.000000000000000E+000
  0.985447249006981       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
