         180           8
  0.992402625570907       0.736246161983420       0.422857268915723     
  0.153388267607956      -0.137679915811733      -0.405745234675995     
 -0.577744266102567      -0.773045456408501     
  -2.47583323533478       -2.31912159711757       -2.12439662409889     
  -1.83998979325545       -1.55718147112684       -1.29923642197575     
 -0.998563606477415      -0.765791627964368     
 -7.949336601061532E-003  0.000000000000000E+000
   1.00981031538020       0.000000000000000E+000
   1.01424894488626       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
