         180           8
   6.01748924797703        5.73489656578513        5.59894811850862     
   5.43351593795118        5.19785706515052        4.88734306838160     
   4.58456735229113        4.44085615551995     
  -5.71420150656053       -5.94980535578087       -5.67907912021877     
  -5.22522327283946       -4.94387479185080       -4.68570270058853     
  -4.42282475114639       -4.17300688726147     
 -8.131219563595754E-003  0.000000000000000E+000
   1.00965932531461       0.000000000000000E+000
   1.01390068814877       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
