         180           8
  0.157941826242749      -0.140535491900807      -0.369762748582947     
 -0.565718082463001      -0.810689259039736       -1.11658270826611     
  -1.30695222723397       -1.29073415499745     
  -5.26280215309556       -5.15397858986330       -5.01094148321795     
  -4.77354422306429       -4.45247574019314       -4.27984435416606     
  -4.10106034905621       -3.63056571311879     
 -8.264315019337238E-003  0.000000000000000E+000
   1.00969250499907       0.000000000000000E+000
   1.01379899373807       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
