         180           3
   5.37550238096116        6.80325979384157        8.73962001906572     
  -6.43320644591591       -4.88691039339891       -4.02591400403649     
  1.380261934960648E-003  0.000000000000000E+000
  0.987303985024619       0.000000000000000E+000
  0.984806877502725       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
