         180           8
   1.89212221679106        1.65880636124652        1.40421874353138     
   1.14321624797765       0.842891125056991       0.519370283490833     
  0.264847357603542       0.131263431784828     
  -6.47993359305710       -6.13062300729610       -5.77127259698496     
  -5.41675472683623       -5.01920234969662       -4.66905448700724     
  -4.40947559564138       -3.98396979418447     
 -8.129371626723961E-003  0.000000000000000E+000
   1.00961734862514       0.000000000000000E+000
   1.01375744055927       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
