         180           8
  -4.81020938235237       -5.00650713095474       -5.15208255145052     
  -5.29881002568329       -5.40065673873832       -5.49946729248768     
  -5.46803594642100       -5.40425918219862     
  -4.92870063012682       -4.62798285962141       -4.34799103603425     
  -4.03039159174814       -3.76152795129632       -3.71633133856011     
  -3.60656785544627       -3.32426142292905     
 -8.245486814254003E-003  0.000000000000000E+000
   1.00935464894799       0.000000000000000E+000
   1.01340527194933       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
