         180           8
 -0.801258085813586       -1.12552357659515       -1.24540327242745     
  -1.40847631799634       -1.56486625989572       -1.77547088074767     
  -2.01221174670462       -2.23733442045342     
  -5.78214534451577       -5.62812452699764       -5.23402047224784     
  -4.90282132390250       -4.68362095452707       -4.40875991003309     
  -4.12861707958281       -3.94001431719424     
 -8.137242377711513E-003  0.000000000000000E+000
   1.00936602038731       0.000000000000000E+000
   1.01329107202190       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
