         180           3
   5.60054187735920        7.32292997459221        8.81070293941431     
  -4.42857792206039       -4.04996113344547       -2.67720030947692     
  1.010870754420177E-003  0.000000000000000E+000
  0.987263851394803       0.000000000000000E+000
  0.984718100027439       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
