         180           8
 -0.193517330363225      -0.382328198767493      -0.659009754718191     
 -0.822808865993655       -1.00374007280430       -1.18119684348651     
  -1.27512671332309       -1.44772037998248     
  -5.84072838278799       -5.51777821911670       -5.38080661489960     
  -5.11397261741251       -4.81050385060785       -4.58519298413051     
  -4.29324997647664       -4.02378062880820     
 -8.124063225352059E-003  0.000000000000000E+000
   1.00953396314187       0.000000000000000E+000
   1.01386316900609       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
