         180           8
 -0.780602836031673       -1.07676747137271       -1.26401149447537     
  -1.40352013981218       -1.60474138721690       -1.83375533986578     
  -2.05929951977345       -2.28421924810882     
  -5.73833214442595       -5.62132748905224       -5.24792314913825     
  -4.84805950814754       -4.53222935524012       -4.28983623451452     
  -4.10970906006569       -3.97711515715716     
 -8.190117997190063E-003  0.000000000000000E+000
   1.00974382785950       0.000000000000000E+000
   1.01391908287227       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
