         180           8
 -0.740723746855996       -1.26009308296009       -1.65375179329977     
  -1.92051649830514       -2.17713201214858       -2.50288051535115     
  -2.73236274998959       -2.89376711256915     
  -5.16202504935039       -5.42238252199618       -5.67823452957324     
  -5.66783024505008       -5.61755905917372       -5.57072628664680     
  -5.47236303789512       -5.78998523345625     
 -8.062556623816053E-003  0.000000000000000E+000
   1.00976961549964       0.000000000000000E+000
   1.01363339142384       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
