         180           8
  -2.89537416707750       -3.10490652074877       -3.38481656351471     
  -3.62735021432782       -3.87140404432757       -4.07946588294939     
  -4.32269676926149       -4.42974517088248     
  -5.53245115990406       -5.48478959862443       -5.41656400113187     
  -5.28178665336379       -5.21017104430452       -5.18208574101769     
  -5.36821195015154       -5.67102599670083     
 -8.096961709177841E-003  0.000000000000000E+000
   1.00961981085716       0.000000000000000E+000
   1.01380868625961       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
