         180           8
  -5.29438025688073       -5.62455043126017       -5.92308530927178     
  -6.13176604116562       -6.27583786818255       -6.51391190559318     
  -6.80047580750822       -6.99166368892104     
  -4.07124402761019       -4.38058133312187       -4.58441805863530     
  -4.68380592447864       -4.64603006440417       -4.54631538571089     
  -4.56771078503419       -4.82722505737231     
 -8.136044709316064E-003  0.000000000000000E+000
   1.00894472696750       0.000000000000000E+000
   1.01314406215036       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
