         180           8
  -2.93696891886309       -3.24730975055270       -3.55525932273296     
  -3.84053925580633       -4.03448364250587       -4.24244334471899     
  -4.41793707951112       -4.41734909233548     
  -4.75616327125897       -4.86648715690265       -5.00513786843310     
  -5.13136433011807       -5.16864624922487       -5.30442908363971     
  -5.43419060132908       -5.21671175186720     
 -8.051671534415980E-003  0.000000000000000E+000
   1.00920334186940       0.000000000000000E+000
   1.01324671041638       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
