         180           8
  0.433707511430174      -0.256142075730404      -0.720917914302766     
  -1.04057570761347       -1.29778615387677       -1.63566302689928     
  -1.96273546358939       -2.13605634285650     
  -4.90225558659954       -5.19711620743160       -5.50114824818518     
  -5.59421602044706       -5.53000551126167       -5.43955327540597     
  -5.48931854061860       -5.65220721201524     
 -8.022992064294394E-003  0.000000000000000E+000
   1.00945543047313       0.000000000000000E+000
   1.01331070441808       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
