         179           8
   3.83351003237822        3.21159523571680        2.84187452483020     
   2.44909285005662        2.11465452937550        1.74579368914761     
   1.35550624920004        1.23086720964393     
  -5.46636117524350       -5.75593333162267       -5.70451307006230     
  -5.72881126755808       -5.78356947333378       -5.73252537350502     
  -5.93778191812620       -6.16005122584036     
 -7.954578871276286E-003  0.000000000000000E+000
   1.00957928135593       0.000000000000000E+000
   1.01345430030165       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
