         180           8
  -5.20234014793003       -5.69468432072073       -5.79154902703032     
  -5.85811771419196       -5.99154059508965       -6.17123591338474     
  -6.32259438625274       -6.31900792251560     
  -4.70874839824672       -5.11908624372075       -5.25410777169274     
  -5.19673122286986       -5.12350797109737       -4.97507784596402     
  -4.78025669344671       -4.81888706828562     
 -8.177890319312556E-003  0.000000000000000E+000
   1.00916212572539       0.000000000000000E+000
   1.01329592167906       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
