         180           8
   3.01770636038524        2.16096041783460        1.44641468056499     
  0.660274410095611      -5.131575200806836E-002 -0.794201871921328     
  -1.62988229208175       -2.36687638594863     
  -2.93026328969173       -3.13589932799415       -3.21748282134652     
  -3.34531198395366       -3.38650061843131       -3.04705166526013     
  -2.53561789413199       -2.15034732204350     
 -8.698241808904644E-003  0.000000000000000E+000
   1.01042387772975       0.000000000000000E+000
   1.01457028768011       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
