         180           8
 -0.616923939143619      -0.873768386503848       -1.06866169711524     
  -1.24089290104999       -1.40725160890708       -1.56030333231408     
  -1.63979238114426       -1.73290758590764     
  -5.17218024578918       -4.96453201596869       -4.73622292113251     
  -4.51869071399345       -4.35673660998798       -4.14852113451591     
  -3.81737347428490       -3.62058773998764     
 -8.403157074321656E-003  0.000000000000000E+000
   1.00989452349036       0.000000000000000E+000
   1.01395953569519       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
