         180           8
   2.96628579946372        2.21998574665915        1.47709752232845     
  0.773807601732200       0.107379507851451      -0.510610761556771     
  -1.09747052937832       -1.83091981143615     
  -2.29357857799959       -2.38320791885777       -2.66393351241891     
  -3.10779927210484       -3.55561141501052       -3.81964437424011     
  -3.97636672170757       -4.23367725705932     
 -8.839189759729058E-003  0.000000000000000E+000
   1.01039912537112       0.000000000000000E+000
   1.01401479876603       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
