         180           8
   4.80219223501254        4.07986522768204        3.38362781418508     
   2.68097454274196        1.96005406197741        1.19361151956562     
  0.479306820481401      -0.210656687870111     
  -2.89176495707387       -3.00417826216283       -3.16057500941612     
  -3.31984007434257       -3.49939562793329       -3.60652224852969     
  -3.67978572692042       -3.84214890221763     
 -8.875077727725420E-003  0.000000000000000E+000
   1.01034369152569       0.000000000000000E+000
   1.01476653590227       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
