         180           8
  -2.40772173066702       -2.65079508576705       -2.89916176023212     
  -3.15184454501367       -3.41953896192856       -3.69476266769071     
  -3.90934060351193       -4.06538411349224     
  -3.88222317610449       -3.50780677412504       -3.15017389481634     
  -2.82731844238593       -2.52844051204707       -2.33792378049729     
  -2.31884618888868       -2.30146906980676     
 -8.826454886445158E-003  0.000000000000000E+000
   1.00996224311436       0.000000000000000E+000
   1.01428925190032       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
