         180           8
   2.28591874633061        1.68705890019636       0.934215332460470     
  0.225115291157707      -0.484636945021762       -1.16521216368061     
  -1.80863852080843       -2.51301957997764     
  -1.84432308733830       -2.13930695105718       -2.30769320718864     
  -2.56783835221569       -2.83684407163247       -3.09143254665410     
  -3.34062236611334       -3.65552390082854     
 -8.736285186604048E-003  0.000000000000000E+000
   1.01013298515660       0.000000000000000E+000
   1.01407462158260       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
