         180           8
   2.86031302570744        2.20944826906493        1.47599638210619     
  0.783828899281603       0.163647295724233      -0.452003912124299     
  -1.09279990920795       -1.70011841764893     
  -1.32285474852688       -1.66281276193796       -2.00351763735582     
  -2.63275524366192       -2.93731372670784       -2.92916116101379     
  -3.00912318730125       -3.11263864202109     
 -8.722972688581696E-003  0.000000000000000E+000
   1.01005898588847       0.000000000000000E+000
   1.01491846728839       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
