         180           8
   2.36673138400397        1.52110164699538       0.886073634754920     
  0.249993105035022      -0.448820496893733       -1.14343447927356     
  -1.81117064826164       -2.44741562640721     
  0.301401115291637      -0.575179564595784      -0.980674750637565     
  -1.06246580281550       -1.25456923780790       -1.49989011398921     
  -1.77639123327351       -2.14247849255435     
 -8.920858628017890E-003  0.000000000000000E+000
   1.01022992836867       0.000000000000000E+000
   1.01418380941340       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
