         180           8
   3.04039412135168        2.20770151547785        1.44935853100872     
  0.633072952489062      -0.110161654076171      -0.737486283681784     
  -1.35036970668340       -1.90905670549289     
  8.635355185066772E-002 -0.515524625996680      -0.862555611429274     
  -1.21435017870989       -1.47194211946603       -1.59629000586331     
  -1.80445307273404       -1.83951075276862     
 -8.873043419860003E-003  0.000000000000000E+000
   1.01038433928027       0.000000000000000E+000
   1.01415753065055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
