         180           8
 -0.696942892719210       -1.60335526838775       -2.42425419279603     
  -3.15999823494954       -3.87883085548109       -4.55030655048110     
  -5.03266378681903       -5.48241841396712     
  0.397986039624676      -6.120188579674349E-002 -0.219370768327853     
 -0.284200108577479      -0.329743631295196      -0.669271310439834     
 -0.895380648259910      -0.837272672242713     
 -8.866333994015797E-003  0.000000000000000E+000
   1.00970056228558       0.000000000000000E+000
   1.01443215775718       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
