         180           8
 -0.487847798268699      -0.764166237751981      -0.925647296182265     
 -0.987685995859631       -1.10661533638990       -1.23448294026042     
  -1.33294966783848       -1.62166346684802     
  -3.51009682271083       -3.37326699176118       -3.26382568263253     
  -2.93156605914098       -2.53296299865127       -2.28324074114649     
  -2.11876007968743       -1.74371292424087     
 -8.624216652454572E-003  0.000000000000000E+000
   1.00959903445657       0.000000000000000E+000
   1.01388251102715       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
