         180           8
 -0.204115535468045      -0.444530051142862      -0.746071164264866     
  -1.05673621826162       -1.23351661078876       -1.29477239907060     
  -1.40711169650701       -1.60943016239620     
  -3.53212086910540       -3.30095774214779       -3.02163496928864     
  -2.90014211862918       -2.78446623295752       -2.43622860288276     
  -2.05175672048158       -1.79300602003123     
 -8.708684661724810E-003  0.000000000000000E+000
   1.00919136480334       0.000000000000000E+000
   1.01338563523975       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
