         180           8
  -4.23314455492598       -4.45201603961210       -4.56401484919102     
  -4.70552668594750       -4.87860509383761       -5.04735740038773     
  -5.22035448521037       -5.25051391549830     
  -3.50442971882103       -3.10792299318395       -2.73921361089204     
  -2.38463052711551       -2.03296174579427       -1.81691497451161     
  -1.71499638951214       -1.60086008697788     
 -8.849464658044950E-003  0.000000000000000E+000
   1.00945367271224       0.000000000000000E+000
   1.01384557699197       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
