         180           8
   3.02891588063783        2.25816333093128        1.61039868389753     
  0.928096892546412       0.279908709587046      -0.394920010277637     
  -1.10168583752488       -1.61200599319948     
  -1.57809637753624       -1.92432702452272       -2.18610837067870     
  -2.36499910096239       -2.44593856084790       -2.56963089383268     
  -2.81340482618550       -2.98716191264557     
 -8.863611511451505E-003  0.000000000000000E+000
   1.00997017793742       0.000000000000000E+000
   1.01403235110571       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
